Atm osphericPressure

A ug us t2 0 3

46 0 48 0 50 0 52 0 54 0 56 0 58 0

CountingRate

J U N G F R A U J O C H I G Y

1. 8 .0 3 - 31 .8 .0 3 U T

P R E S S U R E C O R R E C T E D D A T A

1 46 0 51 0

5

10

31

2 3 4

6 7 8 9 1

15

20

12 13 14

16 17 18 19

21

25

30

2 23 24

26 27 28 29

52 6 50 0

[m mHg] [10_3cts/h]

75 ]

[] S no w fa l: D ay s 29 -3 1

[