460470480490500510497

Atmospheric Pressure

[mmHg]

010203040506070809101112131415161718192021222324252627282930

June 2023

520540560580600620640

Counting Rate

[10^3 cts/h]

555 010203040506070809101112131415161718192021222324252627282930J U N G F R A U J O C H IGY

01.06. - 30.06.2023 UT

PRESSURE CORRECTED DATA

Snow fall: Days 22-23