470480490500510520500

Atmospheric Pressure

[mmHg]

01020304050607080910111213141516171819202122232425262728293031

May 2023

1100

1150

1200

1250

1300

1350

1400

Counting Rate

[10^3 cts/h]

1203

01020304050607080910111213141516171819202122232425262728293031J U N G F R A U J O C H NM64

01.05. - 31.05.2023

PRESSURE CORRECTED DATA

Snow fall: Days 1, 10-11, 14-15

Increasing count rate due to melting snow: Days 27-31