470480490500510520503

Atmospheric Pressure

[mmHg]

010203040506070809101112131415161718192021222324252627282930

June 2023

1100

1150

1200

1250

1300

1350

1400

Counting Rate

[10^3 cts/h]

1292

010203040506070809101112131415161718192021222324252627282930J U N G F R A U J O C H NM64

01.06. - 30.06.2023

PRESSURE CORRECTED DATA

Increasing count rate due to melting snow: Days 1-21, 24-26

Snow fall: Days 22-23